Click this button to print the cartridge alignment test page.


Click this button to save the alignment settings.


Horizontal Align :

From the alignment test page choose the setting which most closely resembles the icon shown.


Vertical Align :

From the alignment test page choose the setting which most closely resembles the icon shown.


Letter Quality Align :

From the alignment test page choose the setting which most closely resembles the icon shown.

NOTE : The value you select will be saved in the printer’s memory. The default value for this setting will remain 3 as shown. To verify that you changes have been registered print the test page again. This time pattern number 3 should correspond to the pattern you select the first time you ran the ultilty.


Draft Align :

From the alignment test page choose the setting which most closely resembles the icon shown.

NOTE : The value you select will be saved in the printer’s memory. The default value for this setting will remain 3 as shown. To verify that you changes have been registered print the test page again. This time pattern number 3 should correspond to the pattern you select the first time you ran the ultilty..